import { Metadata } from "next";
import { redirect } from "next/navigation";
import { Home } from "./_components/Home";
import { createLogger } from "@link-stack/logger";

const logger = createLogger('link-page');
// import { getServerSession } from "app/_lib/authentication";
// import { Home } from "@link-stack/leafcutter-ui";
// import { getUserVisualizations } from "@link-stack/opensearch-common";
// import { LeafcutterWrapper } from "@link-stack/leafcutter-ui";

export const metadata: Metadata = {
  title: "CDR Link - Home",
};

export default async function Page() {
  const leafcutterEnabled = process.env.LEAFCUTTER_ENABLED === "true";
  const dashboardURL = process.env.LEAFCUTTER_DEFAULT_DASHBOARD_URL;

  if (!leafcutterEnabled) {
    redirect("/overview/recent");
  }
  /*
  const session = await getServerSession();
  const {
    user: { email },
  }: any = session;
   */
  let visualizations = [];
  /*
  try {
    visualizations = await getUserVisualizations(email ?? "none", 20);
  } catch (e) {
    logger.error({ meta: e.meta }, "Error metadata");
  }

  return (
    <LeafcutterWrapper>
      <Home visualizations={visualizations} showWelcome={false} />
    </LeafcutterWrapper>
  );
   */

  return <Home url={dashboardURL} />;
}
